---
title: Re-run tests multiple times with the Bun test runner
sidebarTitle: Re-run tests
mode: center
---

The `--rerun-each` flag runs every test multiple times. Use it to find flaky or non-deterministic tests.

```sh terminal icon="terminal"
# re-run each test 10 times
bun test --rerun-each 10
```

---

See [`bun test`](/test).
